
-- 推广员后台首页快捷菜单 ZCL

DROP TABLE IF EXISTS `tab_quick_menu`;
CREATE TABLE `tab_quick_menu` (
  `id` int(10) unsigned NOT NULL AUTO_INCREMENT COMMENT '文档ID',
  `name` varchar(50) NOT NULL DEFAULT '' COMMENT '菜单名称',
  `url` varchar(255) NOT NULL DEFAULT '' COMMENT '链接地址',
  `icon` varchar(50) DEFAULT '0' COMMENT '菜单ICON',
  `status` tinyint(1) NOT NULL DEFAULT '0' COMMENT '状态',
  PRIMARY KEY (`id`),
  KEY `status` (`status`)
) ENGINE=MyISAM AUTO_INCREMENT=17 DEFAULT CHARSET=utf8;

-- ----------------------------
-- Records of tab_quick_menu
-- ----------------------------
INSERT INTO `tab_quick_menu` VALUES ('1', '账户信息', '/index.php?s=/Home/Promote/base_info.html', '11', '0');
INSERT INTO `tab_quick_menu` VALUES ('2', '组长管理', '/index.php?s=/Home/Promote/mychlid.html', '12', '0');
INSERT INTO `tab_quick_menu` VALUES ('3', '推广员管理', '/index.php?s=/Home/Promote/mygrand.html', '0', '0');
INSERT INTO `tab_quick_menu` VALUES ('4', '数据汇总', '/index.php?s=/Home/Query/summary.html', '0', '0');
INSERT INTO `tab_quick_menu` VALUES ('5', '充值明细', '/index.php?s=/Home/Query/recharge.html', '0', '0');
INSERT INTO `tab_quick_menu` VALUES ('6', '注册明细', '/index.php?s=/Home/Query/register.html', '0', '0');
INSERT INTO `tab_quick_menu` VALUES ('7', 'ARPU统计', '/index.php?s=/Home/Query/arpu_analysis.html', '0', '0');
INSERT INTO `tab_quick_menu` VALUES ('8', '留存统计', '/index.php?s=/Home/Query/retention_analysis.html', '0', '0');
INSERT INTO `tab_quick_menu` VALUES ('9', '角色查询', '/index.php?s=/Home/Query/userPlayers.html', '0', '0');
INSERT INTO `tab_quick_menu` VALUES ('10', '专服管理', '/index.php?s=/Home/Apply/index.html', '0', '0');
INSERT INTO `tab_quick_menu` VALUES ('11', '扶持申请', '/index.php?s=/Home/Support/index.html', '0', '0');
INSERT INTO `tab_quick_menu` VALUES ('12', '扶持记录', '/index.php?s=/Home/Support/lists.html', '0', '0');
INSERT INTO `tab_quick_menu` VALUES ('13', '扶持额度', '/index.php?s=/Home/Support/quota.html', '0', '0');
INSERT INTO `tab_quick_menu` VALUES ('14', '我的平台币', '/index.php?s=/Home/PromoteCoin/myCoin.html', '0', '0');
INSERT INTO `tab_quick_menu` VALUES ('15', '平台币转移', '/index.php?s=/Home/PromoteCoin/record.html', '0', '0');
INSERT INTO `tab_quick_menu` VALUES ('16', '平台币充值', '/index.php?s=/Home/CoinOrder/order_list.html', '0', '0');

-- 推广员后台首页快捷菜单关联表 ZCL

DROP TABLE IF EXISTS `tab_promote_quick_menu`;
CREATE TABLE `tab_promote_quick_menu` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `promote_id` int(11) DEFAULT NULL COMMENT '推广员ID',
  `quick_menu_id` int(11) DEFAULT NULL COMMENT '快捷菜单ID',
  `create_time` int(11) DEFAULT NULL COMMENT '创建时间',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=19 DEFAULT CHARSET=latin1;

-- ----------------------------
-- Records of tab_promote_quick_menu
-- ----------------------------
INSERT INTO `tab_promote_quick_menu` VALUES ('4', '1', '3', '1569719823');
INSERT INTO `tab_promote_quick_menu` VALUES ('6', '1', '5', '1569719828');
INSERT INTO `tab_promote_quick_menu` VALUES ('7', '1', '6', '1569719830');
INSERT INTO `tab_promote_quick_menu` VALUES ('8', '1', '7', '1569719832');
INSERT INTO `tab_promote_quick_menu` VALUES ('9', '1', '14', '1569719835');
INSERT INTO `tab_promote_quick_menu` VALUES ('10', '1', '15', '1569719839');
INSERT INTO `tab_promote_quick_menu` VALUES ('11', '1', '12', '1569719849');
INSERT INTO `tab_promote_quick_menu` VALUES ('12', '1', '13', '1569719852');
INSERT INTO `tab_promote_quick_menu` VALUES ('14', '1', '8', '1569719866');
INSERT INTO `tab_promote_quick_menu` VALUES ('15', '1', '9', '1569719870');
INSERT INTO `tab_promote_quick_menu` VALUES ('16', '1', '10', '1569719877');
INSERT INTO `tab_promote_quick_menu` VALUES ('18', '1', '1', '1569720739');

-- 2019-10-01 by elf 
alter table tab_game_source add column `original_url` varchar(255) NOT NULL default '' COMMENT '原包路径';
alter table tab_game_source add column `org_plist_url` varchar(255) NOT NULL default '' COMMENT '原包Plist路径';

-- ----------------------------
-- 2019-10-08 cxj
-- ----------------------------
ALTER TABLE `tab_game` ADD COLUMN `server_type`  tinyint(2) NOT NULL DEFAULT 1 COMMENT '1-专服 2-混服' AFTER `support_ratio`;
ALTER TABLE `tab_game` ADD COLUMN `detail_content` MEDIUMTEXT NULL DEFAULT NULL COMMENT '游戏资料介绍' AFTER `features`;

-- ----------------------------
-- 2019-10-10 cxj
-- ----------------------------
ALTER TABLE `tab_promote` ADD COLUMN `child_game_permission`  tinyint(2) NOT NULL DEFAULT 0 COMMENT '下级游戏添加权限 0-本账号已添加游戏 1-所有游戏' AFTER `idcard`;

-- 2019-10-11 cxj
ALTER TABLE `tab_apply` ADD COLUMN `bale_sort`  int(5) NOT NULL DEFAULT 0 COMMENT '打包顺序' AFTER `offline_status`;

-- ----------------------------
-- 2019-10-11 zyx
-- ----------------------------
ALTER TABLE `tab_user` ADD COLUMN `last_device_number`  varchar(50) DEFAULT '' COMMENT '上一次登录设备号' AFTER `device_tab_protect_log_readnumber`;
ALTER TABLE `tab_user` ADD COLUMN `last_login_ip`  varchar(16) DEFAULT '' COMMENT '上一次登录id' AFTER `login_ip`;

CREATE TABLE `tab_protect_log` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `game_id` int(11) NOT NULL DEFAULT '0' COMMENT '游戏id',
  `game_name` varchar(30) NOT NULL DEFAULT '' COMMENT '游戏名称',
  `server_id` int(11) NOT NULL DEFAULT '0' COMMENT '服务器id',
  `server_name` varchar(30) NOT NULL DEFAULT '' COMMENT '游戏服务区',
  `user_id` int(11) NOT NULL DEFAULT '0' COMMENT '用户id',
  `user_account` varchar(30) NOT NULL DEFAULT '' COMMENT '测试账号',
  `nickname` varchar(30) NOT NULL DEFAULT '' COMMENT '角色名称',
  `promote_id` int(11) NOT NULL DEFAULT '0' COMMENT '推广员id',
  `promote_account` varchar(30) NOT NULL DEFAULT '' COMMENT '推广员',
  `type` tinyint(2) DEFAULT '1' COMMENT '异常类型',
  `detail` varchar(200) DEFAULT '' COMMENT '异常内容',
  `create_time` int(11) DEFAULT '0' COMMENT '创建时间',
  PRIMARY KEY (`id`)
) ENGINE=MyISAM AUTO_INCREMENT=5 DEFAULT CHARSET=utf8 ROW_FORMAT=DYNAMIC;

-----------------
--测试资源申请表--
-----------------
CREATE TABLE `tab_test_resource` (
  `id` int(11) NOT NULL AUTO_INCREMENT COMMENT '主键自增',
  `user_id` int(11) DEFAULT '0' COMMENT '对应角色的id',
  `user_account` varchar(50) DEFAULT NULL COMMENT '用户帐号',
  `user_password` varchar(248) DEFAULT NULL COMMENT '用户密码',
  `phone` varchar(15) DEFAULT '' COMMENT '手机号码',
  `role_name` varchar(50) DEFAULT NULL COMMENT '角色名',
  `game_id` int(11) NOT NULL COMMENT '游戏id',
  `game_name` varchar(30) NOT NULL COMMENT '游戏名称',
  `server_name` varchar(30) NOT NULL COMMENT '区服名称',
  `server_id` int(11) DEFAULT NULL COMMENT '对接区服id',
  `promote_id` int(11) DEFAULT '0' COMMENT '所属推广员id',
  `promote_account` varchar(30) DEFAULT '' COMMENT '所属推广员账号',
  `apply_name` varchar(30) DEFAULT '' COMMENT '申请人名称',
  `apply_id` int(11) DEFAULT '0' COMMENT '申请人id',
  `apply_remark` varchar(200) DEFAULT '' COMMENT '申请备注',
  `apply_resource` int(11) DEFAULT '0' COMMENT '申请资源数量',
  `apply_status` tinyint(2) DEFAULT '0' COMMENT '审核状态 0未审核 1未通过 2通过/发放',
  `apply_type` int(2) DEFAULT '0' COMMENT '扶持类型 0：新增 1：后续',
  `verify_resource` int(11) DEFAULT '0' COMMENT '实际发放',
  `verify_remark` varchar(200) DEFAULT '' COMMENT '审核意见',
  `create_time` int(11) DEFAULT '0' COMMENT '申请时间',
  `verify_time` int(11) DEFAULT '0' COMMENT '审核时间',
  PRIMARY KEY (`id`) USING BTREE,
  KEY `user_id` (`user_id`) USING BTREE,
  KEY `game_id` (`game_id`) USING BTREE,
  KEY `promote_id` (`promote_id`) USING BTREE,
  KEY `create_time` (`create_time`) USING BTREE
) ENGINE=InnoDB AUTO_INCREMENT=1 DEFAULT CHARSET=utf8 ROW_FORMAT=COMPACT COMMENT='测试资源申请';

-- 2019-10-09 by elf
alter table tab_user_play_info add column `create_time` int(11) NOT NULL DEFAULT '0' COMMENT '角色创建时间';
alter table tab_user_play_info add column `create_ip` varchar(16) NOT NULL DEFAULT '' COMMENT '角色创建IP';
alter table tab_user_play_info add column `create_device_number` varchar(50) NOT NULL DEFAULT '' COMMENT '角色创建设备号';
alter table tab_server add column `server_id` varchar(50) not NULL default '' COMMENT '对接区服id';

-- ----------------------------
-- 2019-10-11 zyx
-- ----------------------------
CREATE TABLE `sys_document_read` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `document_id` int(11) NOT NULL DEFAULT '0' COMMENT '文档模型基础表id',
  `category_id` int(10) NOT NULL DEFAULT '0' COMMENT '所属分类',
  `promote_id` int(11) NOT NULL DEFAULT '0' COMMENT '推广员id',
  `create_time` int(11) DEFAULT '0' COMMENT '创建时间',
  PRIMARY KEY (`id`)
) ENGINE=MyISAM AUTO_INCREMENT=9 DEFAULT CHARSET=utf8 ROW_FORMAT=DYNAMIC;

CREATE TABLE `tab_protect_log_read` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `log_id` int(11) NOT NULL DEFAULT '0' COMMENT '日志id',
  `promote_id` int(11) NOT NULL DEFAULT '0' COMMENT '推广员id',
  `create_time` int(11) DEFAULT '0' COMMENT '创建时间',
  PRIMARY KEY (`id`)
) ENGINE=MyISAM AUTO_INCREMENT=25 DEFAULT CHARSET=utf8 ROW_FORMAT=DYNAMIC;

-- 增加用户Token 验证用户
ALTER TABLE `tab_user`
ADD COLUMN `user_token`  char(64) CHARACTER SET utf8 COLLATE utf8_general_ci NOT NULL DEFAULT '' COMMENT '用户token 登入时下发' AFTER `token`;

-- ----------------------------
-- 2019-10-17 zyx
-- ----------------------------
alter table `tab_giftbag` modify COLUMN `giftbag_version` tinyint(2) COMMENT '运营平台 0双平台 1and 2ios 3超级签'

-- 2019-10-22 cxj
UPDATE `sys_model` SET list_grid = "id:编号\r\nsort:排序\r\ngame_name:游戏名称\r\ngame_type_name:游戏类型\r\ngame_type_id:游戏类型\r\ngame_appid:游戏appid\r\ngame_status|get_info_status:显示状态\r\npay_status|get_info_status:支付状态\r\nicon:图片id\r\napply_status:审核状态\r\ncategory:开放类型\r\nrecommend_status|get_info_status*1:推荐状态\r\nrelation_game_id:关联游戏id\r\nrelation_game_name:关联游戏名称\r\nsdk_version:运营平台\r\ndevelopers:开发商\r\ndow_num:下载\r\nonline_status:上线状态\r\ncreate_time:创建时间\r\nserver_type:混服管理\r\npartner_id:合作方\r\nid:操作:[EDIT]&id=[id]|编辑,Game/del?ids=[id]|删除" where id = 15;

-- 2019-10-23 zcl
ALTER TABLE `tab_coin_pay_order` CHANGE COLUMN `currency_num` `coin_num`  int(11) NULL DEFAULT 0 COMMENT '代币数量' AFTER `auditor_time`;

-- 2019-10-23 zcl
update tab_quick_menu set name='订单查询' where name='充值明细'

-- 2019-10-28 cxj
CREATE TABLE `tab_partner` (
  `id` int(11) NOT NULL AUTO_INCREMENT COMMENT '主键',
  `partner` varchar(30) NOT NULL COMMENT '合作方名称',
  `uid` int(11) NOT NULL DEFAULT '0' COMMENT '添加人ID',
  `status` tinyint(3) NOT NULL DEFAULT '1' COMMENT '状态 0-禁用 1-启用',
  `create_time` int(10) NOT NULL DEFAULT '0' COMMENT '添加时间',
  `last_up_time` int(10) NOT NULL DEFAULT '0' COMMENT '最后更新时间',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8;
ALTER TABLE `tab_game` ADD COLUMN `partner_id` int(11) NOT NULL DEFAULT 0 COMMENT '合作方ID' AFTER `supersign_url`;
ALTER TABLE `tab_partner` MODIFY COLUMN `partner` varchar(60) CHARACTER SET utf8 COLLATE utf8_general_ci NOT NULL COMMENT '合作方名称' AFTER `id`;

-- 2019-10-28 chenzhi
CREATE TABLE `tab_spend_count` (
  `id` int(11) NOT NULL AUTO_INCREMENT COMMENT '自增主键',
  `promote_id` int(11) NOT NULL DEFAULT '0' COMMENT '推广员id',
  `promote_account` varchar(30) DEFAULT '' COMMENT '推广员账号',
  `parent_id` int(11) DEFAULT '0' COMMENT '父类ID',
  `parent_name` varchar(30) DEFAULT NULL COMMENT '父类名称',
  `root_id` int(11) DEFAULT 0 COMMENT '根ID',
  `root_name` varchar(30) DEFAULT NULL COMMENT '根名称',
  `game_id` int(11) NOT NULL DEFAULT '0' COMMENT '游戏id',
  `game_name` varchar(30) DEFAULT '' COMMENT '游戏名称',
  `partner_id` int(11) DEFAULT '0' COMMENT '合作方id',
  `partner_name` varchar(50) DEFAULT NULL COMMENT '合作方名称',
  `cash_count` decimal(10,2) DEFAULT '0.00' COMMENT '现金流水',
  `balance_coin_count` decimal(10,2) DEFAULT '0.00' COMMENT '平台币流水',
  `inside_cash_count` decimal(10,2) DEFAULT '0.00' COMMENT '内充流水/绑定币流水',
  `count_date` varchar(30) DEFAULT '' COMMENT '统计月份',
  `create_time` int(11) DEFAULT NULL COMMENT '添加时间',
  PRIMARY KEY (`id`) USING BTREE,
  KEY `game_id` (`game_id`) USING BTREE,
  KEY `promote_id` (`promote_id`) USING BTREE,
  KEY `partner_id` (`partner_id`) USING BTREE,
  KEY `count_date` (`count_date`) USING BTREE
) ENGINE=MyISAM AUTO_INCREMENT=1 DEFAULT CHARSET=utf8 ROW_FORMAT=DYNAMIC COMMENT='游戏流水聚合表';

CREATE TABLE `tab_spend_user_count` (
  `id` int(11) NOT NULL AUTO_INCREMENT COMMENT '自增主键',
  `promote_id` int(11) NOT NULL DEFAULT '0' COMMENT '推广员id',
  `promote_account` varchar(30) DEFAULT '' COMMENT '推广员账号',
  `parent_id` int(11) DEFAULT '0' COMMENT '父类ID',
  `parent_name` varchar(30) DEFAULT NULL COMMENT '父类名称',
  `root_id` int(11) DEFAULT 0 COMMENT '根ID',
  `root_name` varchar(30) DEFAULT NULL COMMENT '根名称',
  `cash_count` decimal(10,2) DEFAULT '0.00' COMMENT '现金流水',
  `balance_coin_count` decimal(10,2) DEFAULT '0.00' COMMENT '平台币流水',
  `inside_cash_count` decimal(10,2) DEFAULT '0.00' COMMENT '内充流水',
  `all_count` decimal(10,2) DEFAULT '0.00' COMMENT '流水和',
  `count_date` varchar(30) DEFAULT '' COMMENT '统计月份',
  `create_time` int(11) DEFAULT NULL COMMENT '添加时间',
  PRIMARY KEY (`id`) USING BTREE,
  KEY `promote_id` (`promote_id`) USING BTREE,
  KEY `parent_id` (`parent_id`) USING BTREE,
  KEY `count_date` (`count_date`) USING BTREE
) ENGINE=MyISAM AUTO_INCREMENT=1 DEFAULT CHARSET=utf8 ROW_FORMAT=DYNAMIC COMMENT='流水角色聚合表';

CREATE TABLE `tab_spend_month_count` (
  `id` int(11) NOT NULL AUTO_INCREMENT COMMENT '自增主键',
  `cash_count` decimal(10,2) DEFAULT '0.00' COMMENT '现金流水',
  `balance_coin_count` decimal(10,2) DEFAULT '0.00' COMMENT '平台币流水',
  `inside_cash_count` decimal(10,2) DEFAULT '0.00' COMMENT '内充流水',
  `all_count` decimal(10,2) DEFAULT '0.00' COMMENT '流水和',
  `count_date` varchar(30) DEFAULT '' COMMENT '统计月份',
  `create_time` int(11) DEFAULT NULL COMMENT '添加时间',
  PRIMARY KEY (`id`) USING BTREE,
  KEY `count_date` (`count_date`) USING BTREE
) ENGINE=MyISAM AUTO_INCREMENT=1 DEFAULT CHARSET=utf8 ROW_FORMAT=DYNAMIC COMMENT='流水月份聚合表';
-----头像---
ALTER TABLE `sys_file`
MODIFY COLUMN `name`  char(255) CHARACTER SET utf8 COLLATE utf8_general_ci NOT NULL DEFAULT '' COMMENT '原始文件名' AFTER `id`;

--downloadlog下载日志数据表
DROP TABLE IF EXISTS `tab_downloadlog`;
CREATE TABLE IF NOT EXISTS `tab_downloadlog` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `logid` varchar(254) NOT NULL DEFAULT '0' COMMENT '日志id',
  `admin_id` int(11) NOT NULL DEFAULT '0' COMMENT '推广者|管理员id',
  `type` varchar(254) NOT NULL DEFAULT '0' COMMENT '下载控制器地址',
  `dataname` varchar(254) NOT NULL DEFAULT '0' COMMENT '导出数据名称',
  `status` int(11) NOT NULL DEFAULT '0' COMMENT '下载状态 0未下载 1已下载',
  `addtime` int(11) NOT NULL DEFAULT '0' COMMENT '添加下载时间戳',
  `begintime` int(11) NOT NULL DEFAULT '0' COMMENT '开始下载时间戳',
  `content` mediumtext COMMENT '备注内容',
  `conditions` varchar(1024) DEFAULT '[]' COMMENT '下载筛选条件',
  PRIMARY KEY (`id`)
) ENGINE=MyISAM AUTO_INCREMENT=220 DEFAULT CHARSET=utf8 COMMENT='下载管理日志';

ALTER TABLE `tab_promote`
	ADD COLUMN `ver_status` TINYINT(2) NULL DEFAULT NULL COMMENT '资质认证审核状态(1是审核成功，2审核失败，3未审核)' AFTER `child_game_permission`,
	ADD COLUMN `idcarpic` CHAR(253) NULL DEFAULT NULL COMMENT '身份证证件照' AFTER `ver_status`,
	ADD COLUMN `businesspic` CHAR(253) NULL DEFAULT NULL COMMENT '营业执照' AFTER `idcarpic`,
	ADD COLUMN `agreementpic` CHAR(253) NULL DEFAULT NULL COMMENT '合同' AFTER `businesspic`,
	ADD COLUMN `address` VARCHAR(520) NULL DEFAULT NULL COMMENT '住址' AFTER `agreementpic`,
	ADD COLUMN `account_type` INT(11) NULL DEFAULT NULL COMMENT '(1为公司，2为个人)' AFTER `address`;

-- 2019-11-06 chenzhi
DROP TABLE IF EXISTS `tab_spend_count`;
CREATE TABLE `tab_spend_count` (
  `id` int(11) NOT NULL AUTO_INCREMENT COMMENT '自增主键',
  `promote_id` int(11) NOT NULL DEFAULT '0' COMMENT '推广员id',
  `promote_account` varchar(30) DEFAULT '' COMMENT '推广员账号',
  `chain` varchar(255) NOT NULL DEFAULT '' COMMENT '推广员链路',
  `level` tinyint(1) NOT NULL DEFAULT '0' COMMENT '推广员级别',
  `game_id` int(11) NOT NULL DEFAULT '0' COMMENT '游戏id',
  `game_name` varchar(30) DEFAULT '' COMMENT '游戏名称',
  `partner_id` int(11) DEFAULT '0' COMMENT '合作方id',
  `partner_name` varchar(50) DEFAULT NULL COMMENT '合作方名称',
  `cash_count` decimal(10,2) DEFAULT '0.00' COMMENT '现金流水',
  `balance_coin_count` decimal(10,2) DEFAULT '0.00' COMMENT '平台币流水',
  `inside_cash_count` decimal(10,2) DEFAULT '0.00' COMMENT '内充流水/绑定币流水',
  `count_date` varchar(30) DEFAULT '' COMMENT '统计月份',
  `create_time` int(11) DEFAULT NULL COMMENT '添加时间',
  PRIMARY KEY (`id`) USING BTREE,
  KEY `game_id` (`game_id`) USING BTREE,
  KEY `promote_id` (`promote_id`) USING BTREE,
  KEY `partner_id` (`partner_id`) USING BTREE,
  KEY `chain` (`chain`) USING BTREE,
  KEY `level` (`level`) USING BTREE,
  KEY `count_date` (`count_date`) USING BTREE
) ENGINE=MyISAM AUTO_INCREMENT=1 DEFAULT CHARSET=utf8 ROW_FORMAT=DYNAMIC COMMENT='游戏流水聚合表';

DROP TABLE IF EXISTS `tab_spend_month_count`;
CREATE TABLE `tab_spend_month_count` (
  `id` int(11) NOT NULL AUTO_INCREMENT COMMENT '自增主键',
  `cash_count` decimal(10,2) DEFAULT '0.00' COMMENT '现金流水',
  `balance_coin_count` decimal(10,2) DEFAULT '0.00' COMMENT '平台币游戏支付流水',
  `balance_coin_deposit` decimal(10,2) DEFAULT '0.00' COMMENT '平台币充值流水',
  `bind_coin_count` decimal(10,2) DEFAULT '0.00' COMMENT '绑币消耗',
  `inside_cash_count` decimal(10,2) DEFAULT '0.00' COMMENT '内充流水',
  `all_count` decimal(10,2) DEFAULT '0.00' COMMENT '流水和',
  `count_date` varchar(30) DEFAULT '' COMMENT '统计月份',
  `create_time` int(11) DEFAULT NULL COMMENT '添加时间',
  PRIMARY KEY (`id`) USING BTREE,
  KEY `count_date` (`count_date`) USING BTREE
) ENGINE=MyISAM AUTO_INCREMENT=1 DEFAULT CHARSET=utf8 ROW_FORMAT=DYNAMIC COMMENT='流水月份聚合表';

DROP TABLE IF EXISTS `tab_spend_user_count`;
CREATE TABLE `tab_spend_user_count` (
  `id` int(11) NOT NULL AUTO_INCREMENT COMMENT '自增主键',
  `promote_id` int(11) NOT NULL DEFAULT '0' COMMENT '推广员id',
  `promote_account` varchar(30) DEFAULT '' COMMENT '推广员账号',
  `chain` varchar(255) NOT NULL DEFAULT '' COMMENT '推广员链路',
  `level` tinyint(1) NOT NULL DEFAULT '0' COMMENT '推广员级别',
  `cash_count` decimal(10,2) DEFAULT '0.00' COMMENT '现金流水',
  `balance_coin_count` decimal(10,2) DEFAULT '0.00' COMMENT '平台币流水',
  `bind_coin_count` decimal(10,2) DEFAULT '0.00' COMMENT '绑定币消耗',
  `inside_cash_count` decimal(10,2) DEFAULT '0.00' COMMENT '内充流水',
  `all_count` decimal(10,2) DEFAULT '0.00' COMMENT '流水和',
  `count_date` varchar(30) DEFAULT '' COMMENT '统计月份',
  `create_time` int(11) DEFAULT NULL COMMENT '添加时间',
  PRIMARY KEY (`id`) USING BTREE,
  KEY `promote_id` (`promote_id`) USING BTREE,
  KEY `chain` (`chain`) USING BTREE,
  KEY `level` (`level`) USING BTREE,
  KEY `count_date` (`count_date`) USING BTREE
) ENGINE=MyISAM AUTO_INCREMENT=1 DEFAULT CHARSET=utf8 ROW_FORMAT=DYNAMIC COMMENT='流水角色聚合表';

-- 2019-11-6 cxj
ALTER TABLE `tab_spend` ADD COLUMN `withdraw_id` int(11) NOT NULL DEFAULT 0 COMMENT '提现ID' AFTER `pay_url`;
ALTER TABLE `tab_withdraw` ADD COLUMN `settlement_end_time` int(10) NOT NULL DEFAULT 0 COMMENT '结算截止时间' AFTER `old_promote_account`;

-- 2019-11-07 chenzhi
INSERT INTO `sys_menu` (`title`, `pid`, `sort`, `url`, `hide`, `tip`, `group`, `is_dev`, `status`) VALUES ('补链详情', '192', '0', 'Mend/shiftInfo', '0', '', '推广补链', '0', '1');
ALTER TABLE `tab_spend_user_count`
ADD COLUMN `bind_coin_count`  decimal(10,2) NULL DEFAULT 0.00 COMMENT '绑定币消耗' AFTER `balance_coin_count`;

-- 2019-11-6 ylw 设备禁用信息表
CREATE TABLE `tab_device_bans` (
  `id` int(11) unsigned NOT NULL AUTO_INCREMENT COMMENT '风控表ID',
  `tag` varchar(255) NOT NULL COMMENT '风控标识',
  `type` tinyint(1) unsigned NOT NULL DEFAULT '0' COMMENT '类型 0未知 1设备号 2IP',
  `operator_id` int(11) unsigned NOT NULL DEFAULT '0' COMMENT '操作者ID',
  `create_time` int(11) unsigned NOT NULL DEFAULT '0' COMMENT '创建时间',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=3 DEFAULT CHARSET=utf8;

-- 2019-11-07   elf   推广员三级变四级
ALTER TABLE `tab_promote` ADD COLUMN `level` tinyint(1) NOT NULL DEFAULT 0 COMMENT '推广员级别' after parent_name;
ALTER TABLE `tab_promote` ADD COLUMN `chain` varchar(30) NOT NULL DEFAULT '' COMMENT '推广员链路' after level;

-- 2019-11-07   elf   迁移任务
ALTER TABLE `sys_shift_task` ADD COLUMN `shift_ids` varchar(255) NOT NULL DEFAULT '' COMMENT '迁移ID';
ALTER TABLE `sys_shift_task` ADD COLUMN `remark` varchar(255) NOT NULL DEFAULT '' COMMENT '备注';


-- 2019-11-07 cxj
ALTER TABLE `tab_withdraw` ADD COLUMN `transfer_proof` int(11) NOT NULL DEFAULT 0 COMMENT '汇款证明' AFTER `settlement_end_time`;

-- 2019-11-08 cxj
ALTER TABLE `sys_document_download` MODIFY COLUMN `id` int(10) NOT NULL AUTO_INCREMENT COMMENT '文档ID' FIRST;
ALTER TABLE `tab_promote`
	CHANGE COLUMN `ver_status` `ver_status` TINYINT(2) NULL DEFAULT '3' COMMENT '资质认证审核状态(1是审核成功，2审核失败，3未审核)' AFTER `child_game_permission`;

-- 2019-11-11 elf
ALTER TABLE `tab_promote_coin_record` ADD COLUMN `promote_id` int(11) NOT NULL DEFAULT 0 COMMENT '推广员ID' AFTER `ref_id`;
ALTER TABLE `tab_promote_coin_record` ADD COLUMN `target_level` tinyint(1) NOT NULL DEFAULT 0 COMMENT '目标对象等级' AFTER `target_type`;
ALTER TABLE `tab_promote_coin_record` ADD COLUMN `game_id` int(11) NOT NULL DEFAULT 0 COMMENT '游戏ID' AFTER `target_level`;

CREATE TABLE `tab_promote_coin_transfer_log` (
  `id` int(11) unsigned NOT NULL AUTO_INCREMENT,
  `sn` varchar(30) NOT NULL DEFAULT '' COMMENT '订单号',
  `promote_id` int(11) NOT NULL COMMENT '推广员ID',
  `target_id` int(11) NOT NULL COMMENT '目标对象ID',
  `target_type` tinyint(1) unsigned NOT NULL DEFAULT '0' COMMENT '类型 1 推广员 2 玩家',
  `target_level` tinyint(1) unsigned NOT NULL DEFAULT '0' COMMENT '目标对象等级',
  `num` int(11) NOT NULL DEFAULT '0' COMMENT '转账数量',
  `game_id` int(1) NOT NULL DEFAULT '0' COMMENT '游戏ID',
  `status` tinyint(1) unsigned NOT NULL DEFAULT '0' COMMENT '0 未处理 1 成功',
  `remark` varchar(255) NOT NULL DEFAULT '' COMMENT '备注',
  `description` varchar(255) NOT NULL DEFAULT '' COMMENT '描述说明',
  `create_time` int(11) unsigned NOT NULL DEFAULT '0' COMMENT '创建时间',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8;

ALTER TABLE `tab_downloadlog`
	CHANGE COLUMN `conditions` `conditions` VARCHAR(20480) NULL DEFAULT '[]' COMMENT '下载筛选条件' AFTER `content`;

-- 2019-11-17 zhengyongxing
UPDATE `platform_new`.`tab_quick_menu` SET `url` = '/index.php?s=/Home/PromoteCoin/transferLogs.html' WHERE `id` = 15
UPDATE `platform_new`.`tab_quick_menu` SET `url` = 'index.php?s=/Home/Promote/children/promote_type/1.html' WHERE `id` = 2
UPDATE `platform_new`.`tab_quick_menu` SET `url` = '/index.php?s=/Home/Promote/children/promote_type/2.html' WHERE `id` = 3

-- 增加tab_spend extend 字段长度到255
ALTER TABLE `tab_spend`
MODIFY COLUMN `extend`  varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '通知游戏方扩展(一般是游戏方透传)' AFTER `pay_game_status`;


ALTER TABLE `tab_spend`
ADD COLUMN `exists`  int(11) NOT NULL DEFAULT 0 COMMENT '0 不存在  1存在' AFTER `withdraw_id`,
ADD COLUMN `pay_url`  text CHARACTER SET utf8 COLLATE utf8_general_ci NULL AFTER `exists`;
ALTER TABLE `tab_deposit`
ADD COLUMN `pay_url`  text CHARACTER SET utf8 COLLATE utf8_general_ci NULL COMMENT '支付信息' AFTER `check_sign`;

--创建消息未读记录
CREATE TABLE `tab_notice_read` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `notice_id` int(11) NOT NULL COMMENT '广告id',
  `game_id` int(11) DEFAULT NULL,
  `user_id` int(11) NOT NULL COMMENT '用户id',
  `is_read` tinyint(2) DEFAULT '0' COMMENT '0未读1已读',
  `create_time` int(11) DEFAULT NULL COMMENT '创建时间',
  PRIMARY KEY (`id`)
) ENGINE=MyISAM AUTO_INCREMENT=9 DEFAULT CHARSET=utf8;

-- 2019-11-19 cxj
-- 添加索引
ALTER TABLE `tab_user_play_info` ADD INDEX `search`(`promote_id`, `game_id`, `server_id`, `create_time`);
ALTER TABLE `tab_user_login_record` ADD INDEX `search`(`promote_id`, `game_id`, `server_id`, `login_time`);
ALTER TABLE `tab_spend` ADD INDEX `search`(`promote_id`, `game_id`, `server_id`, `pay_way`, `pay_status`, `pay_time`);


--2019-11-19 chenzhi
CREATE TABLE `tab_index_chart` (
  `id` int(11) NOT NULL AUTO_INCREMENT COMMENT '主键自增',
  `date` int(11) NOT NULL DEFAULT '0' COMMENT '日期时间戳',
  `new_user_hours` varchar(500) NOT NULL DEFAULT '' COMMENT '新增用户聚合',
  `new_user_count` int(11) NOT NULL DEFAULT '0' COMMENT '单日新增总计',
  `active_user_hours` varchar(500) NOT NULL DEFAULT '' COMMENT '活跃用户聚合',
  `active_user_count` int(11) NOT NULL DEFAULT '0' COMMENT '单日活跃总计',
  `active_user_list` longtext NOT NULL DEFAULT '' COMMENT '单日活跃用户的id序列',
  `pay_user_hours` varchar(500) NOT NULL DEFAULT '' COMMENT '付费用户聚合',
  `pay_user_count` int(11) NOT NULL DEFAULT '0' COMMENT '单日付费用户总计',
  `pay_user_list` longtext NOT NULL DEFAULT '' COMMENT '单日付费用户的id序列',
  `pay_money_hours` varchar(500) NOT NULL DEFAULT '' COMMENT '付费金额聚合',
  `pay_money_count` decimal(10,2) DEFAULT '0.00' COMMENT '单日付费金额总计',
  `promote_new_hours` varchar(500) NOT NULL DEFAULT '' COMMENT '小时新增渠道',
  `promote_new_count` int(11) NOT NULL DEFAULT '0' COMMENT '新增合作渠道总计',
  `all_count`  varchar(500) NOT NULL DEFAULT '' COMMENT '累计的统计数据',
  `create_time` int(11) NOT NULL DEFAULT '0' COMMENT '统计日期',
  PRIMARY KEY (`id`),
  KEY `date` (`date`) USING BTREE
) ENGINE=InnoDB AUTO_INCREMENT=1 DEFAULT CHARSET=utf8 COMMENT='首页折线图静态数据';
-- 添加登录日统计表
CREATE TABLE `tab_login_daily_record` (
  `id` int(11) unsigned NOT NULL AUTO_INCREMENT,
  `game_id` int(11) unsigned NOT NULL DEFAULT '0' COMMENT '游戏ID',
  `user_id` int(11) unsigned NOT NULL DEFAULT '0' COMMENT '用户ID',
  `promote_id` int(11) unsigned NOT NULL DEFAULT '0' COMMENT '推广员id',
  `create_time` int(11) unsigned NOT NULL DEFAULT '0' COMMENT '创建时间',
  PRIMARY KEY (`id`),
  KEY `search` (`promote_id`,`game_id`,`create_time`) USING BTREE,
  KEY `user_id` (`user_id`) USING BTREE
) ENGINE=InnoDB AUTO_INCREMENT=284597 DEFAULT CHARSET=utf8;
--sdk 支付信息
ALTER TABLE `tab_pay_info`
MODIFY COLUMN `order_id`  varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NOT NULL DEFAULT '' COMMENT '平台订单ID' AFTER `game_id`,
ADD COLUMN `extend`  varchar(255) NOT NULL DEFAULT '' COMMENT 'cp订单ID' AFTER `game_id`;


--推广员补充说明

ALTER TABLE `tab_promote`
	CHANGE COLUMN `ver_status` `ver_status` INT(11) NULL DEFAULT '0' COMMENT '资质认证审核状态(1是审核成功，2审核失败，3未审核,4修改认证)' AFTER `child_game_permission`,
	ADD COLUMN `anothpic` CHAR(254) NULL DEFAULT NULL AFTER `account_type`;
